NGrid
6 6
XBound
0 20
YBound
0 13
DigPrecX
1 f
DigPrecY
1 f
ViewportX
0.05
ViewportY
0.05
LabelX
Distance
LabelY
Density 
#Title
Tension Profile
ScaleX
0.2
OffSetX
-9.95
ScaleY
3.9
PosLegend
.7 .8 .9 .9
Line
1 #number of line
0.0 0.7  0.0 1.0 #color
2 # 0 no line, 1 dots, 2 lines, 3 lines and dots
Phob
Line
2 #number of line
0.0 0.0  0.7 1.0 #color
2 # 0 no line, 1 dots, 2 lines, 3 lines and dots
Phil
Line
3 #number of line
0.7 0.0  0.0 1.0 #color
2 # 0 no line, 1 dots, 2 lines, 3 lines and dots
Nanoparticle

