Parsing flasvars ** Host: localhost ** Port: 90 ** Config Host: localhost ** Library url SelectionArrow.swf ** Library name SelectionArrow ** IOError ioError on connect: Socket Timeout (20000 ms). Possible Firewall.. Port was 90 ** SecurityError in 20012 ** SecurityError on connect: Error #2048. Por