Parsing flasvars ** Host: 5.85.169.243 ** Port: 90 ** Library url SelectionArrow.swf ** Library name SelectionArrow ** IOError ioError on connect: Socket Timeout (20000 ms). Possible Firewall.. Port was 90 ** SecurityError in 20049 ** SecurityError on connect: Error #2048. Port was 90 ** Connection 